%************************************************
\chapter{Experiment Resources}%
\label{ch:benchmarks}
%************************************************

All experiments included in this thesis were conducted on a dedicated node in a
computation cluster. The machine operates using a \textbf{Intel Xeon 8260}
\gls{cpu}, which has 24 non-hyperthreaded cores, and has access to
\textbf{268.55 GB} of \gls{ram}. Each experimental test was given exclusive
access to a single \gls{cpu} core and access to sufficient \gls{ram}.

\section{Software}%
\label{sec:bench-soft}

\section{MiniZinc Models}%
\label{sec:bench-models}

\section{Other Programs}%
\label{sec:bench-programs}
