\nonstopmode{}
\documentclass[
paper=9in:6in,
DIV=calc,
]{scrbook}

\title{A Modern Architecture for High-Level Constraint Modelling Languages}
\author{Jip J. Dekker}

\input{assets/packages}
\input{assets/layout}
\input{assets/shorthands}

% Bibliography preamble
\addbibresource{assets/bibliography/references.bib}
\addbibresource[label=ownpubs]{assets/bibliography/dekker_publications.bib}

% Glossary / Acronym preamble
\input{assets/glossary}
\input{assets/acronyms}

\begin{document}

\frontmatter{}
\maketitle{}
\include{chapters/0_abstract}

\chapter{Publications}

Some ideas and figures included in this thesis have previously appeared in the
following publication:

\begin{refsection}[ownpubs]
    \small
    \nocite{*} % is local to to the enclosing refsection
    \printbibliography[heading=none]
\end{refsection}

\mainmatter{}
\include{chapters/1_introduction}
\include{chapters/2_background}
\include{chapters/3_paradigms}
\include{chapters/4_rewriting}
\include{chapters/5_half_reif}
\include{chapters/6_incremental}

\backmatter{}

\printbibliography{}

\printglossary[type=\acronymtype]{}
\printglossary{}

\end{document}
